Distracting Digital Devices

How often do you check your phone throughout the day? Research suggests that the average American adult checks his or her phone every 6.5 minutes. Digital devices have become an obsession for many of us. Has anyone e-mailed us in the last six minutes? Is anyone liking my post on Facebook? Was that a text...

The post Distracting Digital Devices appeared first on The Gospel Message.